--- trunk/uoms-doc/manual.tex	2010/04/08 10:41:26	3
+++ trunk/uoms-doc/manual.tex	2010/04/12 12:09:22	4
@@ -19,6 +19,16 @@
 \usepackage{fancyhdr}
 
 %\renewcommand{\headrulewidth}{0pt}
+
+
+\begin{document}
+
+\pagestyle{plain}
+
+\include{titlepage}
+
+\clearpage
+
 \fancyhead[L]{}
 \fancyhead[C]{
   \includegraphics[height=0.07\textwidth]{images/logos/logoUSC}
@@ -32,15 +42,8 @@
 \fancyfoot[L]{\ \ \ \ \ \ \ \ \ \ {\it UOMS User's Manual \ \ \ \ \ \ \ April / 2010} }
 \fancyhf[FC]{\ \ }
 \fancyhf[FR]{\thepage\ \ \ \ \ \ \ \ \ \ }
-
-\begin{document}
-
-\pagestyle{plain}
-
-\include{titlepage}
-
-\clearpage
-
+\renewcommand{\headrulewidth}{0.5pt}
+\renewcommand{\footrulewidth}{0.5pt}
 \pagestyle{fancy}
 \mbox{ }
 
